
&lt;p&gt;&lt;img src=&quot;http://media.signonsandiego.com/img/photos/2011/10/15/e1647010-406f-43a3-bcf4-32997325a05bnews.ap.org_t600.jpg?42b0fb247f69dabe2ae440581a34634cbc5420f3&quot; alt=&quot;Texas A&amp;amp;M&amp;#39;s Damontre Moore (94) sacks Baylor&amp;#39;s Robert Griffin III during the first half of an NCAA college football game Saturday, Oct. 15, 2011, in College Station, Texas. (AP Photo/Jon Eilts)&quot;&gt;&lt;/p&gt;

  &lt;p&gt;Photo by AP&lt;/p&gt;


  &lt;p class=&quot;caption&quot;&gt;Texas A&amp;M&#039;s Damontre Moore (94) sacks Baylor&#039;s Robert Griffin III during the first half of an NCAA college football game Saturday, Oct. 15, 2011, in College Station, Texas. (AP Photo/Jon Eilts) &lt;a href=&quot;/r/303/574037/&quot;&gt;Read story &amp;raquo;&lt;/a&gt;&lt;/p&gt;

